\chapter{Future Work}
    \section{new Data set}
        Are the results different because of the new classification?
    \section{Offset}
        There is no significant effect of an offset in our configuration. When using smaller EEG windows however there might be one. This could be tried in further analyses with small EEG windows.\\
        These small windows however will probably bring other problems as e.g. unstable transformation into Fourier space. So maybe it is necessary to use large windows, then an offset is unnecessary.
